LIBRARY pdh.dll BASE=0x7D050000
EXPORTS
	PdhGetDllVersion
	PdhOpenQueryA
	PdhOpenQueryW
	PdhAddCounterA
	PdhAddCounterW
	PdhRemoveCounter
	PdhCollectQueryData
	PdhCloseQuery
	PdhGetFormattedCounterValue
	PdhGetFormattedCounterArrayA
	PdhGetFormattedCounterArrayW
	PdhGetRawCounterValue
	PdhGetRawCounterArrayA
	PdhGetRawCounterArrayW
	PdhCalculateCounterFromRawValue
	PdhComputeCounterStatistics
	PdhGetCounterInfoA
	PdhGetCounterInfoW
	PdhSetCounterScaleFactor
	PdhConnectMachineA
	PdhConnectMachineW
	PdhEnumMachinesA
	PdhEnumMachinesW
	PdhEnumObjectsA
	PdhEnumObjectsW
	PdhEnumObjectItemsA
	PdhEnumObjectItemsW
	PdhMakeCounterPathA
	PdhMakeCounterPathW
	PdhParseCounterPathA
	PdhParseCounterPathW
	PdhParseInstanceNameA
	PdhParseInstanceNameW
	PdhValidatePathA
	PdhValidatePathW
	PdhGetDefaultPerfObjectA
	PdhGetDefaultPerfObjectW
	PdhGetDefaultPerfCounterA
	PdhGetDefaultPerfCounterW
	PdhBrowseCountersA
	PdhBrowseCountersW
	PdhExpandCounterPathA
	PdhExpandCounterPathW
	PdhLookupPerfNameByIndexA
	PdhLookupPerfNameByIndexW
	PdhLookupPerfIndexByNameA
	PdhLookupPerfIndexByNameW
	PdhOpenLogA
	PdhOpenLogW
	PdhUpdateLogA
	PdhUpdateLogW
	PdhGetLogFileSize
	PdhCloseLog
	PdhSelectDataSourceA
	PdhSelectDataSourceW
	PdhIsRealTimeQuery
	PdhSetQueryTimeRange
	PdhGetDataSourceTimeRangeA
	PdhGetDataSourceTimeRangeW
	PdhCollectQueryDataEx
	PdhFormatFromRawValue
	PdhGetCounterTimeBase
	PdhEncodeWmiPathA
	PdhEncodeWmiPathW
	PdhDecodeWmiPathA
	PdhDecodeWmiPathW
	PdhReadRawLogRecord
	PdhLogServiceCommandA
	PdhLogServiceCommandW
	PdhLogServiceControlA
	PdhLogServiceControlW
